)c (GeV/ chρ 0 2 4 6 8 10 12 14

Probability density

-7 10 -6 10 -5 10 -4 10 -3 10 -2 10 -1 10 1 10 210 = 5.02 TeV NN s ALICE p-Pb c > 0.15 GeV/

T, track p | < 0.9, labη| = 0.4 R Centrality classes (ZNA) Minimum bias 0-20% 20-40% 40-60% 60-80% 80-100%